LIBRARY     e502api.dll

EXPORTS
    E502_UsbGetDevRecordsList
    E502_UsbGetDevRecordsList2
    E16_UsbGetDevRecordsList
    E440_UsbGetDevRecordsList
    E502_UsbGetSerialList
    E16_UsbGetSerialList
    E502_OpenUsb
    E16_OpenUsb
    E502_OpenByIpAddr
    E16_OpenByIpAddr
    E502_MakeDevRecordByIpAddr
    E502_MakeDevRecordByIpAddr2
    E502_MakeDevRecordByEthSvc
    E502_EthConfigCreate
    E502_EthConfigFree
    E502_GetIpAddr
    E502_EthConfigRead
    E502_EthConfigWrite
    E502_EthConfigGetEnabled
    E502_EthConfigSetEnabled
    E502_EthConfigGetAutoIPEnabled
    E502_EthConfigSetAutoIPEnabled
    E502_EthConfigGetAutoIPState
    E502_EthConfigGetUserMACEnabled
    E502_EthConfigSetUserMACEnabled
    E502_EthConfigGetIPv4Addr
    E502_EthConfigSetIPv4Addr
    E502_EthConfigGetIPv4Mask
    E502_EthConfigSetIPv4Mask
    E502_EthConfigGetIPv4Gate
    E502_EthConfigSetIPv4Gate
    E502_EthConfigGetUserMac
    E502_EthConfigSetUserMac
    E502_EthConfigGetFactoryMac
    E502_EthConfigGetInstanceName
    E502_EthConfigSetInstanceName
    E502_EthConfigSetNewPassword
    E502_EthConfigCopy
    E502_SwitchToBootloader
    E502_ReloadFPGA
    E502_CortexExecCmd
    E502_EthSvcRecordFree
    E502_EthSvcRecordGetInstanceName
    E502_EthSvcRecordGetDevName
    E502_EthSvcRecordGetDevSerial
    E502_EthSvcRecordResolveIPv4Addr
    E502_EthSvcRecordIsSameInstance
    E502_EthSvcBrowseStart
    E502_EthSvcBrowseGetEvent
    E502_EthSvcBrowseStop
    E502_EthDevRecordSetCmdPort
    E502_EthDevRecordSetDataPort
    E502_SearchEthForDevicesIPv4Addr
    E502_EthConfigSetTcpCmdPort
    E502_EthConfigSetTcpDataPort
    E502_EthConfigGetTcpCmdPort
    E502_EthConfigGetTcpDataPort
